– 1–

ΔS = ΔQ IN K^0 DECAYS

The relative amount of ΔS ≠ ΔQ component present is measured by the parameter x, defined as

x = A(K^0 → π^−ℓ^+ν)/A(K^0 → π^−ℓ^+ν) . We list Re{x} and Im{x} for K_{e3} and K_{μ3} combined.

CITATION: R.L. Workman et al. (Particle Data Group), Prog.Theor.Exp.Phys. 2022, 083C01 (2022) August 11, 2022 13:25