– 1–

K^∗(892) MASSES AND MASS DIFFERENCES

Unrealistically small errors have been reported by some experiments. We use simple “realistic” tests for the minimum errors on the determination of a mass and width from a sample of N events:

δ_{min}(m) = Γ √ N , δ_{min}(Γ) = 4 Γ √ N . (1)

We consistently increase unrealistic errors before averaging. For a detailed discussion, see the 1971 edition of this Note.

CITATION: R.L. Workman et al. (Particle Data Group), Prog.Theor.Exp.Phys. 2022, 083C01 (2022)

August 11, 2022 13:25